From bc8a559563f4aab88fa6d7d8ecd3109656be9f30 Mon Sep 17 00:00:00 2001
From: Ty Dunn <ty@tydunn.com>
Date: Wed, 6 Sep 2023 23:15:25 -0700
Subject: adjusting some design review notes (#462)

Co-authored-by: Nate Sesti <sestinj@gmail.com>
---
 extension/react-app/src/pages/settings.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'extension/react-app/src/pages/settings.tsx')

diff --git a/extension/react-app/src/pages/settings.tsx b/extension/react-app/src/pages/settings.tsx
index 8bb9b5d2..9a3d3cc2 100644
--- a/extension/react-app/src/pages/settings.tsx
+++ b/extension/react-app/src/pages/settings.tsx
@@ -135,7 +135,7 @@ function Settings() {
                 />
               </h3>
               <TextArea
-                placeholder="Enter system message"
+                placeholder="Enter a system message (e.g. 'Always respond in German')"
                 {...formMethods.register("system_message")}
                 defaultValue={config.system_message}
               />
-- 
cgit v1.2.3-70-g09d2

