From 25eded3e2bb67bac3f05ed8fd724359b20e3d81b Mon Sep 17 00:00:00 2001
From: Nate Sesti <sestinj@gmail.com>
Date: Sun, 25 Jun 2023 21:35:53 -0700
Subject: loading cover page (hidden)

---
 extension/react-app/src/tabs/gui.tsx | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'extension/react-app/src/tabs/gui.tsx')

diff --git a/extension/react-app/src/tabs/gui.tsx b/extension/react-app/src/tabs/gui.tsx
index 4886bfad..445d5700 100644
--- a/extension/react-app/src/tabs/gui.tsx
+++ b/extension/react-app/src/tabs/gui.tsx
@@ -18,6 +18,7 @@ import ReactSwitch from "react-switch";
 import { usePostHog } from "posthog-js/react";
 import { useSelector } from "react-redux";
 import { RootStore } from "../redux/store";
+import LoadingCover from "../components/LoadingCover";
 
 const TopGUIDiv = styled.div`
   overflow: hidden;
@@ -328,6 +329,7 @@ function GUI(props: GUIProps) {
   // const iterations = useSelector(selectIterations);
   return (
     <>
+      <LoadingCover hidden={true} message="Downloading local model..." />
       <TextDialog
         showDialog={showFeedbackDialog}
         onEnter={(text) => {
-- 
cgit v1.2.3-70-g09d2

