From 908fead30300c33a9eadc975309442a5ccf4f859 Mon Sep 17 00:00:00 2001
From: Robby Russell <robby@planetargon.com>
Date: Sun, 30 Aug 2009 18:54:39 -0700
Subject: Updating README to match new path for installation.

---
 README.textile | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'README.textile')

diff --git a/README.textile b/README.textile
index 4a52a1d18..fdfb6afae 100644
--- a/README.textile
+++ b/README.textile
@@ -13,13 +13,13 @@ h3. The manual way
 
 1. Clone the repository
 
-  @git clone git://github.com/robbyrussell/oh-my-zsh.git@
+  @git clone git://github.com/robbyrussell/oh-my-zsh.git ~/.oh-my-zsh@
 
 2. Symlink the zsh config with:
 
   *NOTE*: If you already have a ~/.zshrc file, you should back it up. @cp ~/.zshrc ~/.zshrc.orig@ in case you want to go back to your original settings.
 
-  @ln -s ~/oh-my-zsh/zshrc ~/.zshrc@
+  @ln -s ~/.oh-my-zsh/zshrc ~/.zshrc@
 
 3. Set zsh as your default shell:
 
-- 
cgit v1.2.3-70-g09d2

