From 95f32b4f8b30fbd62e6df8ca66221cdf6f2cc4d9 Mon Sep 17 00:00:00 2001
From: Robby Russell <robby@planetargon.com>
Date: Sun, 30 Aug 2009 17:48:43 -0700
Subject: Updating README to show people how to change their default shell.

---
 README.textile | 12 +++++++++---
 1 file changed, 9 insertions(+), 3 deletions(-)

(limited to 'README.textile')

diff --git a/README.textile b/README.textile
index ebc62d04e..b15b1fd3f 100644
--- a/README.textile
+++ b/README.textile
@@ -6,11 +6,17 @@ h2. Setup
 
 1. Clone the repository
 
-@git clone git://github.com/robbyrussell/oh-my-zsh.git@
+  @git clone git://github.com/robbyrussell/oh-my-zsh.git@
 
-2. Symlink the zsh config with: @ln -s ~/oh-my-zsh/zshrc ~/.zshrc@
+2. Symlink the zsh config with:
 
-3. Start / restart zsh (open a new terminal is easy enough..)
+  @ln -s ~/oh-my-zsh/zshrc ~/.zshrc@
+
+3. Set zsh as your default shell:
+
+  @chsh -s /bin/zsh@
+
+4. Start / restart zsh (open a new terminal is easy enough..)
 
 h3. Problems?
 
-- 
cgit v1.3.1

